(GeV/ Tp

)c (GeV/ Tp 0 1 2 3 4 5 -6 10 -4 10 -2 10 1 210 410

70-80% Central collisions

100)

× (^-π + ^+π 10) × (^-

+ K +K 1) × (p p +

= 2.76 TeV NNs ALICE, Pb-Pb = 200 GeV NNs STAR, Au-Au = 200 GeV NNs PHENIX, Au-Au

VISH2+1 HKM wo Krak

0 1 2 3 4 5 1 1.5 -

π + ^+π

0 1 2 3 4 5 1 1.5 - + K +K

0 1 2 3 4 5 1 1.5 pp +

]^{-2})c

) [(GeV/ yd_Tp/(d

N^2) d Tpπ 1/(2 evN 1/ Data/Model